On paper formats and text size for arXiv submissions

Kasper Peeters, k.peeters@damtp.cam.ac.uk

October 25th, 2000

1 Summary

There is a very simple and standard L^ATEX way to set the width and height of the text of your paper without having to worry about the paper size (“A4”, “letter”, “legal”) on which it will be printed. To use it, your document should look as follows:

\documentclass{article}
\usepackage[totalwidth=480pt, totalheight=680pt]{geometry}

\begin{document}
...
\end{document}

This will set the total text width to 480pt and the total text height (including the line for the page number and any headers/footers) to 680pt. Line and page breaks will be exactly the same everywhere. You can pick any values you like for these two parameters, as long as you do not exceed the following bounds:

totalwidth ≤ 8.26in ≈ 210 mm ≈ 595.27pt ,

totalheight ≤ 11.00in ≈ 279 mm ≈ 791.36pt .

If you do exceed these bounds, your paper will be too wide or too high to print on some or all of the three standard paper formats mentioned above. And it is of course better to leave some margin; the above figures correspond to a situation without any margins at all on the smallest paper size.

If the postscript version of a file prepared this way is retrieved from the US master site, the textwidth × textheight block will be aligned for printing on “letter” size paper. When it is retrieved from a European mirror, it will center correctly on “A4” size paper. In all cases, the actual text width and height will be the same, only the margins will change.

2 Rationale

The standard L^ATEX document classes have very wide margin settings when printed on A4 or letter size paper. The reason for this is that these classes have been tuned for articles appearing in journals, which typically use a smaller paper format. As arXiv preprints are usually printed on standard paper formats, many authors prefer smaller margins.

However, setting the actual margin sizes leads to problems because this will make the text width and height dependent on the paper size on which it is printed. One can instead set the text width and height by hand, but this will make the margins “unbalanced” (a typical result is that the text appears to be shifted down and to the right when formatted for “letter” size paper and printed on “A4”).

There is, however, a simple and standard L^ATEX solution to this problem, in the form of the geometry package. On any modern TEX installation, it is configured to know about the page size which used by the local printer. Therefore, it can automatically determine the amount by which the block of text should be shifted in order to appear centered on the page. It avoids having to set all the various TEX parameters (topmargin, hoffset, voffset, textheight, textwidth) by hand, but more importantly, it ensures that your paper will look the same regardless of where it is printed.

The arXiv sites produce postscript which is tuned for the paper size used locally (e.g. the US site produces postscript intended for “letter” size paper, while the European mirrors produce postscript that is meant to be printed on “A4” size paper). If you use the geometry package, readers will always get a version which prints correctly on the local paper size.